; Step11LT.def : Declares the module parameters for the DLL.

LIBRARY      "Step11LT"
DESCRIPTION  'Step11LT Windows Dynamic Link Library'

EXPORTS
  LIBRARYID    @1
  LIBRARYENTRY @2
  CALLBACKPROCCOMMANDWINDOW @3